Copyright: Copyright 1992-2003 Thought Communications, Inc.
Citation: FaxTalk(r) is a registered trademark and FaxTalk Communicator, and FaxTalk CallControl are trademarks of Thought Communications, Incorporated. All Rights Reserved.


Introduction

Le Fax Viewer fournit divers outils permettant de manipuler l’image de télécopie affichée. Utilisez le Fax Viewer pour afficher, imprimer, réorganiser et modifier les documents de télécopie. Le Fax Viewer inclut également une fonction permettant d’utiliser un scanner compatible TWAIN pour la numérisation des documents à ajouter à une télécopie existante ou pour la création d’un nouveau document de télécopie.

Barre d’outils du Fax Viewer

Le Fax Viewer inclut une barre d’outils permettant un accès rapide aux fonctions fréquemment utilisées telles que l’ouverture, l’impression et l’enregistrement des télécopies. Pour activer la barre d’outils du Fax Viewer, sélectionnez Barre d’outils dans le menu Affichage. La barre d’outils du Fax Viewer s’affiche sous la barre de menu. Vous pouvez basculer entre les grandes et les petites icônes de la barre d’outils en utilisant la commande Grands boutons dans le menu Affichage.

  Rubriques connexes


Ouverture d'une télécopie
Ouverture d’une télécopie

Pour ouvrir un document de télécopie dans le Fax Viewer :

1.	Choisissez la commande Ouvrir dans le menu Fichier.

2.	Sélectionnez le document de télécopie que vous désirez ouvrir.

3.	Cliquez sur le bouton OK.


Enregistrement d'une télécopie
Enregistrement d’une télécopie

Pour enregistrer un document de télécopie dans le Fax Viewer :

1.	Choisissez la commande Enregistrer sous dans le menu Fichier.

2.	Entrez le nom de fichier sous lequel vous désirez enregistrer le document de télécopie.

3.	Cliquez sur le bouton OK.


Réorganisation des pages
Réorganisation des pages dans une télécopie

Le Fax Viewer inclut une fonction permettant de réorganiser l’ordre des pages dans un document de télécopie.

Pour réorganiser les pages dans un document de télécopie :

1.	Sélectionnez un niveau de zoom qui vous permet d’afficher toutes les pages de la télécopie.

2.	Cliquez sur le bouton gauche de la souris et maintenez-le enfoncé lorsque le curseur se trouve sur le bord de la page de la télécopie que vous désirez déplacer. Le curseur change en un pointeur à quatre flèches.

3.	Faites glisser la page de télécopie vers l’endroit désiré et relâchez le bouton gauche de la souris.


Modification du niveau du zoom

Vous pouvez changer la taille de la télécopie affichée dans le Fax Viewer. Les options d’affichage incluent l’ajustage de la page à la largeur ou à la hauteur de la fenêtre de visualisation et la sélection d’un niveau de zoom prédéfini ou personnalisé.

Plusieurs méthodes peuvent être suivies pour changer le niveau du zoom dans le Fax Viewer :

•	Choisissez les commandes Zoom avant et Zoom arrière dans le menu Affichage.

•	Cliquez sur les boutons Zoom avant ou Zoom arrière sur la barre d’outils du Fax Viewer.

•	Définissez les niveaux de zoom en choisissant la commande Zoom dans le menu Affichage et en entrant le niveau de pourcentage désiré.

•	Choisissez la commande Ajuster à la fenêtre (Largeur ou Hauteur) dans le menu Affichage.

•	Sélectionnez un niveau zoom prédéfini directement sur la barre d’outils du Fax Viewer.


Retournement d'une télécopie
Retournement d’une télécopie

Quelquefois une télécopie reçue peut se présenter à l’envers. Vous pouvez retourner une télécopie affichée à l’envers et l’afficher dans le bon sens. Pour retourner un document de télécopie de 180 degrés, choisissez la commande Retourner dans le menu Affichage ou cliquez sur le bouton Retourner dans la barre d’outils du Fax Viewer.


Rotation d'une télécopie
Rotation d’une télécopie

Lorsqu’elle est affichée, vous pouvez faire pivoter une télécopie en intervalles de 90 degrés. Pour faire pivoter un document de télécopie de 90 degrés vers la gauche ou vers la droite, choisissez la commande Faire pivoter vers la gauche ou Faire pivoter vers la droite dans le menu Affichage ou cliquez sur le bouton Faire pivoter vers la gauche ou Faire pivoter vers la droite dans la barre d’outils du Fax Viewer.


Navigation entre les pages d'une télécopie
Navigation entre les pages d’une télécopie

Utilisez la barre de défilement pour faire défiler les pages multiples d’une télécopie affichée. Vous pouvez également utiliser les commandes Aller à la page, Page suivante et Page précédente dans le menu Affichage pour naviguer vers des pages spécifiques.


Affichage des miniatures

Vous pouvez afficher les pages de télécopies en miniatures pour faciliter la navigation et vous aider à réorganiser une télécopie. Pour afficher les versions miniatures d’un document de télécopie, choisissez la commande Miniatures dans le menu Affichage ou cliquez sur le bouton Miniatures dans la barre d’outils Fax Viewer.

Conseils

•	Pour faire un zoom avant dans une page affichée en mode miniature, double-cliquez sur la page désirée.


Amélioration de l'apparence d'une télécopie
Amélioration de l’apparence d’une télécopie

Vous pouvez améliorer l’apparence d’une télécopie en utilisant la fonction anti-crénelage du Fax Viewer. La technique d’anti-crénelage est utilisée pour améliorer l’apparence visuelle d’un document de télécopie en lissant les bords des lettres. Pour activer l’anti-crénelage, choisissez la commande Anti-crénelage dans le menu Affichage ou cliquez sur le bouton Anti-crénelage dans la barre d’outils Fax Viewer.


Affichage d'une télécopie en vidéo inversée
Affichage d’une télécopie en vidéo inversée

Le Fax Viewer affiche une télécopie en texte noir sur fond blanc. Vous pouvez changer cette présentation en texte blanc sur fond noir à l’aide de la fonction vidéo inversée. Pour afficher une télécopie en vidéo inversée, choisissez la commande Vidéo inversée dans le menu Afficher.


Exportation d'une télécopie
Exportation d’une télécopie

Vous pouvez exporter les pages d’une télécopie vers des fichiers graphiques à utiliser dans d’autres programmes.

Pour exporter une page de télécopie :

1.	Sélectionnez la page que vous désirez exporter.

2.	Choisissez la commande Exporter dans le menu Fichier.

3.	Entrez le nom du fichier et cliquez sur OK.

Remarque

•	Si le document de télécopie se compose de plusieurs pages, vous avez l’option d’exporter le document en entier vers un fichier de télécopie uniquement, ou de sélectionner des pages individuelles à exporter vers des formats de fichiers graphiques tels que des fichiers à l’extension .BMP ou .PCX. Les fichiers graphiques tels que les fichiers dont l’extension est .BMP et .PCX ne permettent pas l’enregistrement de plusieurs pages dans un fichier unique.


Suppression de pages dans une télécopie

Vous pouvez supprimer les pages individuelles d’une télécopie . Ceci peut être utile lorsque vous désirez supprimer la page de garde d’un document que vous avez reçu et que vous voulez faire suivre à d’autres destinataires.

Pour supprimer une page dans un document de télécopie :

1.	Cliquez sur la page de télécopie que vous désirez supprimer.

2.	Choisissez la commande Supprimer dans le menu Edition.

3.	Pour sélectionner plusieurs pages, maintenez la touche Ctrl enfoncée tandis que vous cliquez sur les pages de la télécopie.


Impression d'une télécopie
Impression d’une télécopie

Pour imprimer un document de télécopie à partir du Fax Viewer :

1.	Choisissez la commande Imprimer dans le menu Fichier ou cliquez sur le bouton Imprimer dans la barre d’outils du Fax Viewer.

2.	Sélectionnez la plage de pages et le nombre de copies.

3.	Cliquez sur OK pour imprimer les document sur l’imprimante sélectionnée.


Zoom

Entrez la valeur en pourcentage du niveau du zoom et cliquez sur le bouton OK. Vous pouvez entrer une valeur comprise dans une plage de 1 à 200 pour cent.


Option Aller à la page

Entrez le numéro de la page que vous désirez afficher et cliquez sur le bouton OK.